﻿---
sidebar_position: 1
description: Initialize  and other functions to work with HTTP-client in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, HTTP-client]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Initialize 
 Initializes a new empty request



`Function Initialize(Val URL = "") Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | URL | - | String | &#x2716; | URL address for request |

  
  Returns:  DataProcessorObject.OPI_HTTPClient - This processor object

<br/>

:::tip
The function must be called first when creating a new processor object

The URL can be set later using the `SetURL` function
:::

:::caution
**NOCLI:** this method is not available in CLI version
:::
<br/>


```bsl title="1C:Enterprise/OneScript code example"
    URL = FunctionParameters["HTTP_URL"];
    URL = URL + "/get";

    Result = OPI_HTTPRequests
        .NewRequest()
        .Initialize(URL) // <---
        .ProcessRequest("GET")
        .ReturnResponseAsJSONObject();
```
 



```json title="Result"
{
 "args": {},
 "headers": {
  "Accept": "*/*",
  "Accept-Charset": "utf-8",
  "Accept-Encoding": "gzip",
  "Connection": "Keep-Alive",
  "Content-Length": "0",
  "Host": "localhost:2424",
  "Max-Forwards": "10",
  "User-Agent": "1Script v$2.0.0.0",
  "X-Arr-Log-Id": "666a0b1f-55f0-49f8-b586-7495ce8296c2",
  "X-Arr-Ssl": "2048|256|C=BE, O=GlobalSign nv-sa, CN=GlobalSign GCC R6 AlphaSSL CA 2025|CN=*.openintegrations.dev",
  "X-Forwarded-Host": "bin.openintegrations.dev",
  "X-Original-Url": "/get"
 },
 "origin": "***",
 "url": "https://bin.openintegrations.dev/get"
}
```
