﻿---
sidebar_position: 3
description: Is connector  and other functions to work with MongoDB in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, MongoDB]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Is connector 
 Checks that the value is an object of the external MSSQL component



`Function IsConnector(Val Value) Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | Value | - | Arbitrary | &#x2714; | Value to check |

  
  Returns:  Boolean - Is connector

<br/>


:::caution
**NOCLI:** this method is not available in CLI version
:::
<br/>



 




