﻿---
sidebar_position: 4
description: Set instance settings and other functions to work with Green Max in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, Green Max]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Set instance settings
 Sets the instance settings



`Function SetInstanceSettings(Val Settings, Val AccessParameters) Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | Settings | --settings | Structure Of KeyAndValue | &#x2714; | Instance settings. See GetInstanceSettingsStructure |
  | AccessParameters | --access | Structure Of KeyAndValue | &#x2714; | Access parameters. See FormAccessParameters |

  
  Returns:  Map Of KeyAndValue - serialized JSON response from Green API

<br/>

:::tip
Method at API documentation: [SetSettings](https://green-api.com/v3/docs/api/account/SetSettings/)
:::
<br/>


```bsl title="1C:Enterprise/OneScript code example"
    ApiUrl           = "https://3100.api.green-api.com/v3";
    MediaUrl         = "https://3100.api.green-api.com/v3";
    IdInstance       = "31003...";
    ApiTokenInstance = "17915d8e0b4b4975a183478da...";

    AccessParameters = OPI_GreenMax.FormAccessParameters(ApiUrl, MediaUrl, IdInstance, ApiTokenInstance);

    SettingsStructure = New Structure;
    SettingsStructure.Insert("markIncomingMessagesReaded" , "no");
    SettingsStructure.Insert("outgoingWebhook"            , "no");
    SettingsStructure.Insert("outgoingAPIMessageWebhook"  , "yes");

    Result = OPI_GreenMax.SetInstanceSettings(SettingsStructure, AccessParameters);
```
 




