﻿---
sidebar_position: 9
description: Get TLS Settings and other functions to work with TCP in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, TCP]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Get TLS Settings
 Forms settings for using TLS



`Function GetTlsSettings(Val DisableCertVerification, Val CertFilepath = "") Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | DisableCertVerification | --trust | Boolean | &#x2714; | Allows to work with invalid certificates, including self signed |
  | CertFilepath | --cert | String | &#x2716; | Path to the root PEM file of the certificate if it is not in the system repository |

  
  Returns:  Structure Of KeyAndValue - Structure of TLS connection settings

<br/>

:::tip
Tls settings can only be set when a connection is created: explicitly, by using the `OpenConnection` function or implicit, when passing the connection string to the `ProcessRequest` method
:::
<br/>



```bsl title="1C:Enterprise/OneScript code example"
    Result = OPI_TCP.GetTlsSettings(True);
```
 



```json title="Result"
{
 "use_tls": true,
 "accept_invalid_certs": false
}
```
