﻿---
sidebar_position: 3
description: Is connector  and other functions to work with PostgreSQL in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, PostgreSQL]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Is connector 
 Checks that the value is an object of a PostgreSQL AddIn



`Function IsConnector(Val Value) Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | Value | - | Arbitrary | &#x2714; | Value to check |

  
  Returns:  Boolean - Is connector

<br/>


:::caution
**NOCLI:** this method is not available in CLI version
:::
<br/>



```bsl title="1C:Enterprise/OneScript code example"
    Address  = "127.0.0.1";
    Login    = "bayselonarrend";
    Password = "12we...";
    Base     = "postgres";

    ConnectionString = OPI_PostgreSQL.GenerateConnectionString(Address, Base, Login, Password);

    Connection = OPI_PostgreSQL.CreateConnection(ConnectionString);
    Result     = OPI_PostgreSQL.IsConnector(Connection);

    OPI_PostgreSQL.CloseConnection(Result);
```
 




