﻿---
sidebar_position: 9
description: Get object size and other functions to work with FTP in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, FTP]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Get object size
 Get the size of a file or directory if it exists



`Function GetObjectSize(Val Connection, Val Path) Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | Connection | --conn | Arbitrary | &#x2714; | Existing connection or connection configuration |
  | Path | --path | String | &#x2714; | Path to the object |

  
  Returns:  Map Of KeyAndValue - Processing result

<br/>

:::tip
FTP Command: `SIZE`
:::
<br/>



```bsl title="1C:Enterprise/OneScript code example"
    Host     = "172.33.0.10";
    Port     = "21";
    Login    = "bayselonarrend";
    Password = "12we...";

    UseProxy = True;
    FTPS     = True;

    ProxySettings = Undefined;
    TLSSettings   = Undefined; // FTPS

    FTPSettings = OPI_FTP.GetConnectionSettings(Host, Port, Login, Password);

    If UseProxy Then

        ProxyType = "http"; // http, socks5, socks4

        ProxyAddress  = "127.0.0.1";
        ProxyPort     = "8071";
        ProxyLogin    = "proxyuser";
        ProxyPassword = "12we...";

        ProxySettings = OPI_FTP.GetProxySettings(ProxyAddress, ProxyPort, ProxyType, ProxyLogin, ProxyPassword);

    EndIf;

    If FTPS Then
        TLSSettings = OPI_FTP.GetTLSSettings(True);
    EndIf;

    Connection = OPI_FTP.CreateConnection(FTPSettings, ProxySettings, TLSSettings);

    If OPI_FTP.IsConnector(Connection) Then
        Result = OPI_FTP.GetObjectSize(Connection, "new_dir/big.bin");
    Else
        Result = Connection; // Error of connection
    EndIf;
```
 



```json title="Result"
{
 "bytes": 335944730,
 "result": true
}
```
