﻿---
sidebar_position: 9
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Get timekeeping status
 Gets user timekeeping status



`Function GetTimekeepingStatus(Val URL, Val UserID = "", Val Token = "") Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | URL | --url | String | &#x2714; | URL of webhook or a Bitrix24 domain, when token used |
  | UserID | --userid | String, Number | &#x2716; | Users ID. Current by default |
  | Token | --token | String | &#x2716; | Access token, when app auth method used |

  
  Returns:  Map Of KeyAndValue - serialized JSON of answer from Bitrix24 API

<br/>

:::tip
Method at API documentation: [timeman.status](https://dev.1c-bitrix.ru/rest_help/timeman/base/timeman_status.php)
:::
<br/>


```bsl title="1C:Enterprise/OneScript code example"
    URL = "https://b24-ar17wx.bitrix24.by/rest/1/1o2...";

    Result = OPI_Bitrix24.GetTimekeepingStatus(URL);

    URL    = "b24-ar17wx.bitrix24.by";
    Token  = "f69b1367006e9f06006b12e400000001000...";
    UserID = 1;

    Result = OPI_Bitrix24.GetTimekeepingStatus(URL, UserID, Token);
```
 



```json title="Result"
{
  "result": {
  "STATUS": "PAUSED",
  "TIME_START": "2024-07-30T07:10:51+00:00",
  "TIME_FINISH": "2024-07-30T08:32:00+00:00",
  "DURATION": "00:00:00",
  "TIME_LEAKS": "00:09:59",
  "ACTIVE": false,
  "IP_OPEN": "",
  "IP_CLOSE": "",
  "LAT_OPEN": 0,
  "LON_OPEN": 0,
  "LAT_CLOSE": 0,
  "LON_CLOSE": 0,
  "TZ_OFFSET": 10800
  },
  "time": {
  "start": 1722328322.65261,
  "finish": 1722328322.6837,
  "duration": 0.0310959815979004,
  "processing": 0.00899505615234375,
  "date_start": "2024-07-30T08:32:02+00:00",
  "date_finish": "2024-07-30T08:32:02+00:00",
  "operating_reset_at": 1722328922,
  "operating": 0
  }
  }
```
