﻿---
sidebar_position: 3
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Disable all database connections
 Terminates all connections to the database except the current one



`Function DisableAllDatabaseConnections(Val Base, Val Connection = "", Val Tls = "") Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | Base | --base | String | &#x2714; | Database name |
  | Connection | --dbc | String, Arbitrary | &#x2716; | Connection or connection string |
  | Tls | --tls | Structure Of KeyAndValue | &#x2716; | TLS settings, if necessary. See GetTlsSettings |

  
  Returns:  Map Of KeyAndValue - Result of query execution

<br/>




```bsl title="1C:Enterprise/OneScript code example"
    Address  = "127.0.0.1";
    Login    = "bayselonarrend";
    Password = "12we...";
    Base     = "testbase1";

    ConnectionString = OPI_PostgreSQL.GenerateConnectionString(Address, Base, Login, Password);

    // When using the connection string, a new connection is initialised,
    // which will be closed after the function is executed.
    // If several operations are performed, it is desirable to use one connection,
    // previously created by the CreateConnection function()
    Result = OPI_PostgreSQL.DisableAllDatabaseConnections(Base, ConnectionString);
```
 

 <Tabs>
  
    <TabItem value="bash" label="Bash" default>
        ```bash
            oint postgres DisableAllDatabaseConnections \
             --base "testbase1" \
             --dbc "postgresql://bayselonarrend:***@127.0.0.1:5432/"
        ```
    </TabItem>
  
    <TabItem value="bat" label="CMD/Bat" default>
        ```batch
            oint postgres DisableAllDatabaseConnections ^
             --base "testbase1" ^
             --dbc "postgresql://bayselonarrend:***@127.0.0.1:5432/"
        ```
    </TabItem>
</Tabs>


```json title="Result"
{
 "data": [
  {
   "pg_terminate_backend": true
  }
 ],
 "result": true
}
```
