﻿---
sidebar_position: 3
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Form connection parameters
 Forms a collection of connection parameters



`Function FormConnectionParameters(Val URL, Val Password, Val ReadTimeout = 30, Val WriteTimeout = 30) Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | URL | --url | String | &#x2714; | Server URL |
  | Password | --pass | String | &#x2714; | Password for connection |
  | ReadTimeout | --rtout | Number | &#x2716; | Response timeout (in seconds) |
  | WriteTimeout | --wtout | Number | &#x2716; | Request sending timeout (in seconds) |

  
  Returns:  Structure Of KeyAndValue - Structure of connection parameters

<br/>




```bsl title="1C:Enterprise/OneScript code example"
    URL          = "127.0.0.1:25565";
    Password     = "Jg9F...";
    WriteTimeout = 20;
    ReadTimeout  = 20;

    Result = OPI_RCON.FormConnectionParameters(URL, Password, ReadTimeout, WriteTimeout);
```
 




