﻿---
sidebar_position: 1
description: Create Connection  and other functions to work with SSH in the Open Integration Package, a free open-source integration library for 1C:Enterprise 8, OneScript and CLI
keywords: [1C, 1С, 1С:Enterprise, 1С:Enterprise 8.3, API, Integration, Services, Exchange, OneScript, CLI, SSH]
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

# Create Connection 
 Creates a new SSH session



`Function CreateConnection(Val SSHSettings, Val Proxy = "") Export`

  | Parameter | CLI option | Type | Required | Description |
  |-|-|-|-|-|
  | SSHSettings | - | Structure Of KeyAndValue | &#x2714; | Connection settings structure |
  | Proxy | - | Structure Of KeyAndValue | &#x2716; | Proxy settings structure, if necessary |

  
  Returns:  Arbitrary, Map of KeyAndValue - Create Connection

<br/>

:::tip
Get the connection configuration using the functions `GetSettingsLoginPassword`, `GetSettingsPrivateKey`, `GetSettingsViaAgent`
:::

:::caution
**NOCLI:** this method is not available in CLI version
:::
<br/>


```bsl title="1C:Enterprise/OneScript code example"
    Host = "172.33.0.13";
    Port = "2222";

    UseProxy          = True;
    ProxySettings     = Undefined;
    AuthorizationType = "By login and password";

    If AuthorizationType = "By login and password" Then

        Login    = "bayselonarrend";
        Password = "12we...";

        SSHSettings = OPI_SSH.GetSettingsLoginPassword(Host, Port, Login, Password);

    ElsIf AuthorizationType = "By key" Then

        Login      = "bayselonarrend";
        PrivateKey = "./ssh_key";
        PublicKey  = "./ssh_key.pub";

        SSHSettings = OPI_SSH.GetSettingsPrivateKey(Host, Port, Login, PrivateKey, PublicKey);

    Else

        Login       = "bayselonarrend";
        SSHSettings = OPI_SSH.GetSettingsViaAgent(Host, Port, Login);

    EndIf;

    If UseProxy Then

        ProxyType = "http"; // http, socks5, socks4

        ProxyAddress  = "127.0.0.1";
        ProxyPort     = "8071";
        ProxyLogin    = "proxyuser";
        ProxyPassword = "12we...";

        ProxySettings = OPI_SSH.GetProxySettings(ProxyAddress, ProxyPort, ProxyType, ProxyLogin, ProxyPassword);

    EndIf;

    Result = OPI_SSH.CreateConnection(SSHSettings, ProxySettings);
```
 



```json title="Result"
"AddIn.OPI_SSH.Main"
```
